-- Migration: Increase users.status column size
-- Description: Increase VARCHAR(20) to VARCHAR(30) to accommodate longer status values
--              like 'force_change_password' (21 chars) without truncation errors.

ALTER TABLE users ALTER COLUMN status TYPE VARCHAR(30);
